Title: Pass a safety exam for lab/site safety and the use of tools and equipment, if applicable.
Course: Energy and Power (20101-18) > Section: Introducing Safety and Regulations in Energy and Power

Passing should include use of an assessment that measures participation in safety training programs, including safety meetings, and demonstrating knowledge and skills gained from program topics (e.g., interpretation of SDS, use of tools and machines).

Process/Skill Questions:

- How often should one participate in safety training programs? Why?
- How does insurance affect the requirement of continuous retraining for safety?
- What is workers' compensation? What is a safety committee and who are the members?
- What is the OSHA Voluntary Protection Programs (VPP) Star Program?