Title: Identify risks in labeling and barcodes.
Course: Cybersecurity in Food and Agriculture (18204-I) > Section: Investigating Cybersecurity in Agricultural Marketing and Distribution

Identification should include

- improper labeling
- intentional manipulation of labels and barcodes
- consequences of product recalls.

Process/Skill Questions:

- What are the economic and health consequences of mislabeling of products?
- What are the potential risks of large product recalls?
- What governing body is responsible for product recalls?
- How are consumers contacted regarding product recalls?