Title: Analyze the interdependence among the commercial facilities, financial services, and food and agriculture (FA) sectors.
Course: Cybersecurity in Food and Agriculture (18204-I) > Section: Understanding Cybersecurity in Food and Agriculture

Analysis should include possibilities of large-scale revenue losses and catastrophic damage in the event of an attack or failure within one of these sectors.

Process/Skill Questions:

- What are the similarities and differences between the Commercial Facilities, Financial Services, and Food and Agriculture (FA) Sectors?
- What are the different financial services in the agricultural industry?
- Who are the key stakeholders affected by an agriculture-focused cyberattack?
- What is the snowball effect for a massive cyberattack?
- What are the consequences of an attack or failure within one of Homeland Security’s 16 infrastructure sectors, specifically in the agriculture industry?

Teacher Resource: Food and Agriculture Sector-Specific Plan, Cybersecurity & Infrastructure Security Agency (https://www.cisa.gov/food-and-agriculture-sector)