Title: Prepare dental dam equipment and materials for use.
Course: Dental Careers I (14054-I) > Section: Demonstrating Administrative Functions and Chairside Procedures

Preparation should include instrumentation and selection of equipment, materials, and disposables.

Process/Skill Questions

- What is the purpose of the inversion of a dental dam?
- What are at least four pieces of equipment needed to place or remove a dental dam?
- What direction is the dam pulled from the teeth upon removal?