Title: Manage records.
Course: Dental Careers I (14054-I) > Section: Demonstrating Administrative Functions and Chairside Procedures

Management should include the development of files and filing systems and the protection and transfer of files.

Teacher resource:

§ 54.1-2403.3. Medical records; ownership; provision of copies. Code of Virginia

Process/Skill Questions

- What qualifies a patient to be considered active or inactive?
- What are the basic filing procedures?
- What are the regulations for record transfer?
- How are records protected?