Title: Pass safety exam.
Course: Electricity I (17102-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Passing the exam must demonstrate participation in safety training programs, including attending safety meetings and completing periodic demonstration of knowledge and skills gained from program topics (e.g., interpretation of SDS).

Process/Skill Questions:

- How often should one participate in safety training programs? Why?
- How does insurance affect the requirement of continuous retraining for safety?
- What is workers' compensation?