Title: Maintain a safe working environment.
Course: Electricity I (17102-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Maintenance should be ongoing and should include regular inspection of the working environment. Maintenance should result in identifying potential hazards on a job site or in the lab, such as unstable or improperly erected scaffolding, electrical hazards, debris, improperly stored materials, and air quality hazards. When present, hazards must be remedied by appropriate measures, in compliance with school and instructor's guidelines.

Process/Skill Questions:

- What are examples of job site hazards?
- Why is it important to maintain a safe working environment?
- Why is it important to store materials and tools in their proper places?