Title: Describe the employee’s role in ensuring the success of the electrical business.
Course: Electricity I (17102-I) > Section: Focusing on the Electrician's Profession

Description should include how Workplace Readiness Skills and employees’ actions and behavior affect the construction/electrical business’ success.

Process/Skill Questions:

- How does an employee’s work ethic and integrity affect the company and the industry in general?
- What is the role of reading and writing in the workplace?
- What are examples of theft of time?
- What is the value of teamwork on a work site?