Title: Investigate postsecondary training and licensing in the electricity field.
Course: Electricity I (17102-I) > Section: Focusing on the Electrician's Profession

Investigation should result in identifying and differentiating between educational opportunities such as

- two-year and four-year colleges
- military training
- adult learning centers
- professional/private education agencies
- work-based learning (e.g., registered apprenticeship program, cooperative education)
- workshops conducted by the Department of Professional and Occupational Regulations (DPOR).

Process/Skill Questions:

- How does one become a journeyman?
- How does one become a master electrician?
- What is an apprenticeship program?
- What is the difference between a journeyman license and a master electrician license?