Title: Set lintels.
Course: Masonry II (17008-II) > Section: Constructing Commercial Masonry

Setting must include a lintel of correct length being placed above a window, door, or masonry opening to support the wall above. Setting must meet engineered specifications and local building codes.

Process/Skill Questions:

- What is used as a steel lintel?
- What are the OSHA standards regarding the manual lifting of heavy materials or equipment?