Title: Identify hybrid vehicle auxiliary (12V) battery service, repair, and test procedures.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Battery Service

Identification should include following service materials and manufacturer guidelines. (Note: Servicing requirements are similar to those of other 12V batteries.)

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VI. Electrical/Electronic Systems
B. Battery Service
Task 9

Process/Skill Questions:

- How does battery service for a hybrid auxiliary differ from that of a conventional vehicle?
- How is the 12V battery charged in a hybrid vehicle?
- What does the 12V battery do in a hybrid vehicle?