Title: Maintain or restore electronic memory functions.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Battery Service

Procedure should include

- using auxiliary battery/storage device connected to vehicle
- returning vehicle to former condition and operation (may require manual recording or use of a scan tool).

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VI. Electrical/Electronic Systems
B. Battery Service
Task 3

Process/Skill Questions:

- How can an auxiliary battery be connected to the vehicle?
- How much voltage does it take to maintain memory function?
- While connected to auxiliary battery, what actions should be avoided?