Title: Confirm proper battery capacity for vehicle application; perform battery capacity and load test; determine necessary action.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Battery Service

Procedure should include

- exploring load and high-rate discharge
- referring to service materials and manufacturer guidelines.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VI. Electrical/Electronic Systems
B. Battery Service
Task 2

Process/Skill Questions:

- Where would you find the cold cranking amperage (CCA) rating?
- Should a frozen battery be tested? Why or why not?
- What tools are used to perform the battery capacity test?