Title: Remove, inspect, and/or replace generator (alternator).
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Charging System

Procedure should be completed according to service materials and manufacturer guidelines.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VI. Electrical/Electronic Systems
D. Charging System
Task 3

Process/Skill Questions:

- What function do diodes have in an alternator?
- What is the first step in removing an alternator?
- What effect would pulley size have on alternator output?