Title: Inspect engine cooling and heater system hoses and pipes; determine necessary action.
Course: Automotive Technology II (20104-II) > Section: Heating, Ventilation, and Air Conditioning (HVAC): Heating, Ventilation, and Engine Cooling Systems

Procedure should include

- checking hoses for bulges, softness, leaks, and cracks
- checking hose clamps
- following service manuals and manufacturer guidelines.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VII. Heating, Ventilation, and Air Conditioning (HVAC)
C. Heating, Ventilation, and Engine Cooling Systems
Task 1

Process/Skill Questions:

- What specialized tools should be required to inspect engine cooling and heater system hoses and belts?
- What procedures are used to inspect engine cooling and heater system hoses?
- What are some common failures of hoses?