Title: Identify heating, ventilation and air conditioning (HVAC) components and configuration.
Course: Automotive Technology II (20104-II) > Section: Heating, Ventilation, and Air Conditioning (HVAC): General

Identification should include components (i.e., HVAC actuators, heater core, evaporator core, condenser, compressor).

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VII. Heating, Ventilation, and Air Conditioning (HVAC)
A. General
Task 2

Process/Skill Questions:

- How does a heater core function?
- What should the technician do if the air conditioning (A/C) is blowing warm?
- Are actuators vacuum- or electrically controlled?