Title: Perform battery state-of-charge test; determine necessary action.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Battery Service

Performance should include referencing service materials and following manufacturer guidelines.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VI. Electrical/Electronic Systems
B. Battery Service
Task 1

Process/Skill Questions:

- When should a battery state-of-charge test be performed? How often?
- What type of acid is in a lead/acid battery?
- What types of batteries are available?