Title: Adjust valves (mechanical or hydraulic lifters).
Course: Automotive Technology II (20104-II) > Section: Engine Repair: Cylinder Head and Drive Train

Adjustments should include referring to service materials and following manufacturer guidelines.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
I. Engine Repair
B. Cylinder Head and Valve Train
Task 1

Process/Skill Questions:

- How does valve adjustment affect valve timing?
- What problems can result from incorrect valve adjustment?
- How often should valves be checked, and when should they be adjusted?