Title: Describe the operational characteristics of a continuously variable transmission (CVT).
Course: Automotive Technology II (20104-II) > Section: Automatic Transmission and Transaxle: Off-Vehicle Transmission/Transaxle

Description should include the operations of the internal components of a CVT transmission/transaxle.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
II. Automatic Transmission and Transaxle
C. Off-Vehicle Transmission and Transaxle
Task 1

Process/Skill Questions:

- What are phasers?
- What service precautions should be taken when working with a CVT?
- What are the shifting characteristics of a CVT?