Title: Jump-start vehicle using jumper cables and a booster battery or an auxiliary power supply.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Battery Service

Jump start should include using jumper cables and a battery or auxiliary power supply to start a vehicle.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
VI. Electrical/Electronic Systems
B. Battery Service
Task 6

Process/Skill Questions:

- What are the steps in performing a jump start?
- Why is the last connection made away from the battery?
- What personal protective equipment (PPE) should be worn when performing a jump start?