Title: Demonstrate electrical shock emergency procedures.
Course: Applied Agricultural Concepts (18002-II) > Section: Performing Electrical Operations

Demonstration should include

- recognizing symptoms
- following emergency procedures and first-aid steps for electrical shock
- preventing further shock or injuries
- evaluating the cause of initial shock.

Process/Skill Questions:

- How would one determine whether a person has suffered an electrical shock?
- Why should one disconnect the electrical power prior to administering first aid?
- What are some causes of electrical shock?