Title: Inspect course-specific hand and power tools to visually identify defects.
Course: Carpentry I (17003-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Inspection of tools should include

- identifying components of machinery (e.g., guards, blades, moving parts, start/stop switches)
- identifying standard safety procedures (i.e., lab practices and manufacturer recommendations)
- observing a demonstration of the safe operation and use of each piece of machinery in the lab
- identifying tool defects.

Process/Skill Questions:

- What are some of the basic power tools used in construction?
- What are the proper actions to take before using a circular saw?
- Why should a power tool always be grounded?

NCCER Carpentry Standards

Level One, Module Three (27103-13): Hand and Power Tools

Module Three (27103-13) provides detailed descriptions of the hand tools and portable power tools used by carpenters. Emphasis is on safe and proper operation of tools, as well as care and maintenance.

NCCER Core Curriculum: Introductory Craft Skills, 2015

00101-15 Basic Safety

Module One (00101-15) explains the importance of safety in the construction and industrial crafts. Trainees will learn how to identify and follow safe work practices and procedures and how to properly inspect and use safety equipment. Trainees will be able to describe the safety practices associated with elevated work; energy release; and various hazards encountered on job sites.