Title: Pass a safety exam for lab/site safety and the use of tools and equipment specific to the construction industry.
Course: Carpentry I (17003-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Assessment must measure participation in safety training programs, including attending safety meetings and periodically demonstrating knowledge and skills gained from program topics (e.g., interpretation of SDS).

Process/Skill Questions:

- How often should one participate in safety training programs? Why?
- Why are retraining programs relevant to a company's insurance policy?
- What is workers' compensation?

NCCER Core Curriculum: Introductory Craft Skills, 2015

00101-15 Basic Safety

Module One (00101-15) explains the importance of safety in the construction and industrial crafts. Trainees will learn how to identify and follow safe work practices and procedures and how to properly inspect and use safety equipment. Trainees will be able to describe the safety practices associated with elevated work; energy release; and various hazards encountered on job sites.