Title: Interpret computer-aided design (CAD) drawings and blueprints.
Course: Power Generation Design and Function (20904-II) > Section: Reading and Interpreting Technical and Engineering Drawings

Interpretation should include

- interpreting scale (e.g., dimensions)
- converting between U.S. customary units and metric measurements
- identifying standard symbols
- utilizing three dimensional (3D) models
- reading mechanical, electrical, and plumbing CAD drawings and blueprints.

Process/Skill Questions:

- What does scale refer to? Why is it important?
- What are some symbols used in CAD?