Title: Identify concepts related to the implementation of cybersecurity resilience.
Course: Cybersecurity Operations, Advanced (10302-III) > Section: Exploring Architecture and Design

Identification should include

- exploring redundancy concepts
  - geographical dispersal
  - network (e.g., load balancer, network interface card teaming)
  - power (e.g., uninterruptible power supply [UPS], generator, dual supply, managed power distribution units [PDU])

- exploring replication
  - storage area network

- exploring backup types
  - full
  - incremental
  - snapshot
  - differential
  - tape
  - disk
  - copy
  - network-attached storage (NAS)
  - storage area network (SAN)
  - cloud
  - image
  - online vs. offline
  - onsite storage
  - distance considerations

- exploring diversity
  - technologies
  - vendors
  - crypto
  - controls.