Title: Maintain equipment.
Course: Small Animal Care II (18102-II) > Section: Performing Office Functions

Maintenance should include

- identifying equipment commonly used in companion animal training and grooming facilities
- identifying sources for purchasing or renting equipment
- describing methods for repairing equipment
- explaining and applying basic techniques involved in safely cleaning, sanitizing, disinfecting, and maintaining equipment, in accordance with manufacturer instructions
- explaining the importance of maintaining warranty information and other documents connected with equipment.

Process/Skill Questions:

- What resources are available to assist the small animal care worker with equipment maintenance and repair procedures?
- What are some basic safety issues involved in maintaining equipment?