Title: Maintain a safe working environment.
Course: Mechatronics II (13901-II) > Section: Applying Basic Safety Standards for Mechanics

Maintenance should be ongoing and result in identifying potential hazards on a job site or in the lab, such as unstable or improperly installed electrical components, electrical hazards, job site debris, improperly stored materials, and air quality hazards. When present, hazards must be remedied by appropriate measures in compliance with school and instructor guidelines.

Process/Skill Questions:

- What are examples of job-site hazards?
- Why is it important to maintain safe workspace standards on a job site?
- Why is it important to store materials and tools in their proper places?