Title: Assemble the mechanical components in a mechatronic system.
Course: Mechatronics II (13901-II) > Section: Understanding Mechanical Components in a Mechanical System

Assembly could include

- mounting the motor
- balancing the motor
- aligning shafts
- aligning belts
- tensioning chains
- tensioning belts.

Process/Skill Questions:

- How is a motor balanced?
- What is the process of aligning belts on a belt drive train?