Title: (Optional) Present the final product.
Course: Technology Foundations (18 weeks) (21003-18) > Section: Designing a Product

Presentation should include

- explaining the technological problem solved by the model
- identifying the process used for selecting the best solution among alternatives
- citing relevant resources used to research the solution
- explaining the design for the selected solution
- demonstrating the prototype
- highlighting the benefits and trade-offs of the prototype
- soliciting questions and suggested improvements from the audience
- validating selection with data.

Process/Skill Questions:

- Why is it important to solicit suggestions from the audience?
- What methods may be used to capture and maintain the audience’s interest?
- Why is it important to present the prototype to a targeted audience before beginning mass production?