Title: (Optional) Explain a sewage disposal system.
Course: Ecology and Environmental Management (03063-II) > Section: Investigating Waste Management

Explanation may include

- a home septic system
- a municipal sewage plant.

Process/Skill Questions:

- What are the differences and similarities of a home septic system and a municipal sewage plant?
- What percentage of homes in the United States use municipal sewage systems vs. home septic systems? Why is this the case?