Title: Install hydraulic system components.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Installation requires the ability to identify system components and their functions and includes

- removing pressure from the system
- removing and installing valves, pumps, and lines
- checking the system for leaks.

Process/Skill Questions:

- What precautions should be taken when removing pressure from the system?
- What is the first step when replacing a pressure valve?
- What is used to ensure a non-leak fitting?