Title: Inspect and troubleshoot mechanical systems.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Troubleshooting requires a visual inspection of the system to determine a cause of a given problem and includes using a troubleshooting chart and following established procedures to resolve the problem.

Process/Skill Questions:

- How often should a mechanical system be inspected?
- When is it acceptable to modify established troubleshooting procedures? How does one document the modification?