Title: Relate facilities management to sustainability and efficiency.
Course: Energy Supply: Sustainability and Efficiency I (20901-I) > Section: Understanding Utilities Facility Management

Relation should include

- considering site location
- optimizing process flow
- complying with environmental standards
- providing training and professional development.

Process/Skill Questions:

- How does interaction among the roles in a facility affect sustainability and efficiency?
- How do contracting considerations affect sustainability and efficiency?
- How can an individual advocate for improved sustainability or efficiency?