Title: Describe the process and requirements for obtaining industry certifications and/or taking CLEP examinations related to the Accounting course.
Course: Accounting (12104-I) > Section: Preparing for Industry Certification and/or College Level Examination (CLEP) Testing

Description should include a list of industry certifications and the CLEP examination related to the Accounting course and the process/requirements for obtaining the certifications or taking the CLEP examination from

- official websites of the testing organization/vendor
- materials from publishers that have developed practice materials and tests based on information from the testing organization/vendor
- information from certified instructors or industry-certified professionals.