Title: Identify personal protective equipment (PPE) requirements.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration II (17056-II) > Section: Applying Basic Construction Safety Standards (Core Safety)

Identification could include procedures for inspecting, wearing, and removing

- eye protection
- respirator
- hard hat
- gloves
- safety harness
- hearing protection
- safety shoes.

Identification should also include explaining when particular PPE is required.

Process/Skill Questions:

- What are some dangerous effects of sun exposure, and how can these risks be mitigated?
- Why is wearing jewelry prohibited while in the lab or on the job site?