Title: Identify the SI and English units for resistance in each energy system.
Course: Principles of Technology I (03153-I) > Section: UNIT 4: RESISTANCE

Identification should include a measurement of a force divided by rate using units appropriate to the energy system.

Examples of appropriate units should include

- mechanical—lb/(ft/sec) or N/(m/sec)
- fluid—lb/in^2 /(gal/min) or N/m^2/(m^3/sec)
- electrical—V/I or ohms
- thermal—F/(Btu/hr) or C/(Cal/hr).

Process/Skill Questions:

- What would happen if the wrong unit is used?
- What is the SI or English unit for mechanical resistance?
- What is the SI or English unit for fluid resistance?
- What is the SI or English unit for electrical resistance?
- What is the SI or English unit for thermal resistance?