Title: Inspect the rear suspension system leaf spring(s), spring insulators (silencers), shackles, brackets, bushings, center pins/bolts, and mounts.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: Suspension and Steering Systems: Related Suspension and Steering Service

Inspection should be conducted visually, according to state inspection procedures, using specialized tools according to manufacturer guidelines.

Process/Skill Questions:

- What safety precautions should be taken when handling leaf springs?
- What is the purpose of the center bolt? How can it affect alignment?
- What is the purpose of the spring shackle?