Title: Apply architectural principles to drawings, annotation, and dimensioning.
Course: Architectural Drawing and Design (21103-18) > Section: Exploring Architectural Design Foundations

Application should include documenting sizes and locations for exterior and interior design, such as

- height
- width
- depth
- angles
- fillets and rounds
- datum
- surface texture
- room identification
- orientation.

Process/Skill Questions:

- What is the difference between a dimension and square footage annotation?
- How are the electrical and plumbing drawings annotated?
- What basic information is given by dimensioning?
- What is a size dimension?
- What is a datum?