Title: Discuss the ethical implications of emerging technology.
Course: Mental Health Assisting Careers II (14002-II) > Section: Identifying Mental Health Technician (MHT) Communication Strategies

Discussion should include

- ethical dilemmas
- use of social media
- artificial intelligence (AI) and the importance of disclosure.

Process/Skill Questions:

- What are ways to address an ethical dilemma involving a patient?
- What is an appropriate use of AI for patient care?