Title: Protect computers and other electronics and wires during welding procedures.
Course: Auto Body Technology I (20117-I) > Section: Practicing Metal Welding, Cutting, and Joining

Protection should include disconnecting, separating positive and negative battery terminals, or removing a battery.

Process/Skill Questions:

- What should be done to protect electronic components when welding? Why are electronics vulnerable to damage?
- What problems can be encountered when disconnecting battery cables?
- What is available to alleviate problems associated with disconnecting battery cables?