Title: Identify the types of plastic repair procedures.
Course: Auto Body Technology I (20117-I) > Section: Working with Plastics and Adhesives

Identification should include

- cleaning and preparing the surface of the plastic parts
- repairing plastic parts (e.g., urethane bumpers, filler panels) with airless welding
- repairing the plastic parts with urethane or epoxy adhesives, using reinforcements if necessary

following manufacturer guidelines and recommendations.

Process/Skill Questions:

- What are the procedures for repairing the various types of plastic parts?
- How is the surface prepared for the repair?
- How does one determine which repair method to use?