Title: Explaining the fundamentals of machine operation, including tractor/implement compatibility.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing Tillage and Seeding Application Machinery and Equipment

Description should include outlining how to operate machines and describing the fundamentals of implement selection for a given tractor.

Process/Skill Questions:

- What are the fundamentals of machine operations?
- What would determine the size of the tractor needed to operate the implement?