Title: Maintain equipment.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Performing General Mechanical Maintenance

Maintenance should be in accordance with instructor and manufacturer guidelines and should include

- wearing required PPE
- using maintenance schedules and preventive maintenance charts
- compiling a list of parts and supplies necessary to complete a repair or maintenance task
  - identifying parts and supplies needed for the planned task
  - gathering all necessary parts, supplies, and tools

- using diagnostic equipment
- selecting and using tools
- demonstrating proper torquing procedures
- performing repairs and adjustments, as needed.

Process/Skill Questions:

- How can equipment adjustments be located quickly in the manual?
- What is an example of an adjustment that would have to be made to equipment?
- What is an example of a repair that would have to be made to equipment?