Title: (Optional) Replace defective parts of the starting circuit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Starting Circuit

Replacement should include

- wearing required PPE
- making the necessary repairs using appropriate tools, equipment, and repair manuals
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for replacing defective parts of the starting circuit.

Process/Skill Questions:

- How are starter circuit parts replaced?
- What is the first thing to be done before replacing any components in a starting circuit?