Title: Service the power unit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Testing, Servicing, and Repairing the Power Unit

Service should include

- wearing required PPE
- adhering to maintenance schedules and repair manuals
- using appropriate tools and equipment
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for servicing the power unit.

Process/Skill Questions:

- What is the power unit?
- How does the power unit work?
- What are the different components of the power unit?