Title: (Optional) Clean equipment with a steam cleaner and/or high-pressure washer.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Applying Protective Coatings

Cleaning should include

- wearing required PPE
- explaining hazards associated with steam cleaning equipment and high-pressure washers
- explaining safety procedures and protocols related to electricity (proper grounding), chemicals, gas powered washers, and the dangers of high-pressure water injection injuries
- following all safety procedures, guidelines, and protocols related to the use of electricity, chemicals, hot water, and exposure to hot parts
- using a steam and/or high-pressure washer in accordance with manufacturer specifications and guidelines
- covering critical parts
- disposing of runoff, chemicals and grease following federal, state, and local guidelines.

Process/Skill Questions:

- What PPE should be used when cleaning equipment?
- What damage can occur due to improper use of a steam cleaner or high-pressure washer?