Title: Evaluate workstations, equipment, software, and supplies for design, layout, and purchase.
Course: Computer Information Systems, Advanced (10005-IV) > Section: Maintaining, Managing, and Troubleshooting Systems

Evaluation should analyze design features, usability, ergonomics, and affordability.