Title: Apply sterile dressings.
Course: Surgical Technologist II (14056--II) > Section: Demonstrating Intraoperative Procedures

Application should include positioning and securing a sterile dressing according to a physician’s order (e.g., adhesive bandage, 4 by 4 inches; gauze sponge, non-stick dressing).

Process/Skill Questions:

- Why is a physician’s order necessary for the application of a postoperative sterile dressing?
- What precautions should be taken to avoid contamination of the surgical site when applying a postoperative dressing?
- What types of sterile dressing are commonly used after surgery? What are the postoperative indications for each type of dressing?