Title: Demonstrate technical writing.
Course: Medical Laboratory Technology I (14102-I) > Section: Exploring Foundations in Medical Laboratory Technology

Demonstration should include writing that is accurate, easily legible, succinct, and understandable and that conforms to scientific or technical procedures in the medical environment. A template may be used.

Process/Skill Questions:

- Why is it important to use a template when writing laboratory procedures?
- Why is it important to follow proper citation formatting in journal or research articles?
- Why is effective documentation of instrument maintenance and troubleshooting important in the medical laboratory?