Title: Explain the intent of the NEC (Article 90).
Course: Building Trades II (17009-II) > Section: Electricity: Navigating the NEC Book

Explanation should include the

- purpose
- scope
- intent
- enforcement
- code arrangement
- history of the NEC.

IRC: Chapter 35 (https://codes.iccsafe.org/content/IRC2018P4) identifies the NEC's relationship with the IRC.

Process/Skill Questions:

- What is the NEC?
- Who uses the NEC?
- What is the purpose of the NEC?

NCCER Standards:

Electrical

- 26107-02 Introduction to National Electrical Code
- 26111-02 Wiring: Commercial and Industrial
- 26112-02 Wiring: Residential