Title: Inspect engine mounts.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: ENGINE REPAIR: General

Inspection should include

- visually checking, ensuring there are no cracks, leaks, missing hardware, or excessive movement in drive and reverse
- following OEM procedures for removing and replacing engine mounts.

Process/Skill Questions:

- What customer concern may lead one to suspect a bad engine mount?
- What other systems could be affected by a loose engine mount?