Title: Perform a lab activity, using electrical motor-control systems.
Course: Industrial Robotics Technology (21009) > Section: Understanding Power Systems in Robotics

Performance should include wiring a basic motor-control circuit.

Process/Skill Questions:

- How might a START/STOP motor-control circuit be illustrated?
- How might electrical motor-control circuits be used in a robotic workcell?
- What are the three main components of a motor-control system?