Title: Inspect the tie rod ends (sockets), tie rod sleeves, and clamps.
Course: Automotive Technology I (20104-I) > Section: Suspension and Steering Systems: Related Suspension and Steering Service

Inspection should include using hand tools and an alignment machine to align all four wheels to manufacturer specifications.

Process/Skill Questions:

- How is the clamp properly aligned to the adjuster sleeve?
- Why is anti-seize important to use?
- What might be the consequences of using heat for straightening steering components?