Title: Define chemical terminology related to building management.
Course: Building Management I (16103-I) > Section: Measuring and Mixing Chemicals

Defining chemical terminology used in building management should include

- all-purpose cleaner
- biodegradable ("green") cleaners
- disinfectant
- floor finish
- organic digesters
- sealer
- spray buff
- stripper.

Process/Skill Questions:

- What is floor finish?
- When should sealer be used? Why?
- What is an organic digester?
- What is a disinfectant?
- What safety precautions should be used when working with chemicals?
- What are the benefits of biodegradable ("green") cleaners?