Title: Check and adjust clutch master cylinder fluid level; check for leaks; use proper fluid type per manufacturer specification.
Course: Automotive Technology III (20104-III) > Section: Manual Drive Train and Axles: Clutch Diagnosis and Repair

Procedure should include checking for leaks and proper operation and repairing or replacing as necessary.

ASE Education Foundation
2017 Automobile Service Technology (AST) Level
III. Manual Drive Train and Axles
B. Clutch Diagnosis and Repair
Task 5

Process/Skill Questions:

- What type of fluid goes into a hydraulic clutch system?
- What are some failures of a hydraulic clutch system?
- How are internal and external fluid leaks checked?