Title: Perform oil pressure tests; determine needed action.
Course: Automotive Technology III (20104-III) > Section: Engine Repair: Lubrication and Cooling Systems Diagnosis and Repair

Performance should include

- conducting a visual inspection
- using mechanical oil pressure gauge
- following manufacturer guidelines.

ASE Education Foundation
2017 Automobile Service Technology (AST) Level
I. Engine Repair
D. Lubrication and Cooling Systems Diagnosis and Repair
Task 9

Process/Skill Questions:

- When should an oil pressure test be performed?
- What can result from vehicles that continue to operate with low oil pressure?
- Where does the oil pressure gauge attach to the engine?