Title: Inspect, test, adjust, repair, and/or replace electrical/electronic components and circuits, including computers, solenoids, sensors, relays, terminals, connectors, switches, and harnesses; demonstrate understanding of relearn procedure.
Course: Automotive Technology III (20104-III) > Section: Automatic Transmission and Transaxle: In-Vehicle Transmission/Transaxle Maintenance and Repair

Procedures should include using a scan tool, digital multimeter (DMM), or test light to inspect and test electronic components and, if necessary, replace them.

ASE Education Foundation
2017 Automobile Service Technology (AST) Level
II. Automatic Transmission and Transaxle
B. In-Vehicle Transmission/Transaxle Maintenance and Repair
Task 3

Process/Skill Questions:

- What tools are used to inspect, test, and diagnose problems with electrical/electronic components?
- What are the procedures for checking shift solenoids?
- What are some possible failures of relays, switches, and harnesses?