Title: (Optional) Replace hydraulic pumps, valves, cylinders, and hoses.
Course: Agricultural Power Systems (18402-I) > Section: Applying Knowledge of Hydraulics and Pneumatics

Replacement should include

- undergoing safety instruction and testing prior to diagnosing, maintaining, repairing, and/or operating power tools, machinery, or equipment
- following all safety precautions, procedures, guidelines, and manufacturer specifications for hydraulic pump, valve, cylinder, and hose/line replacement
- wearing required PPE for the selected task/application
- following procedures in a systematic plan.

Process/Skill Questions:

- Why is measuring equipment important when rebuilding components?
- Why is it important to follow repair manuals?
- Why is it important that repairs are done and properly inspected?