Title: (Optional) Prepare equipment for painting.
Course: Agricultural Power Systems (18402-I) > Section: Applying Protective Coatings

Preparation should include

- cleaning, sanding, and masking using appropriate tools, equipment, and repair manuals
- following all safety precautions, procedures, guidelines, and manufacturer specifications.

Process/Skill Questions:

- What PPE is required for painting?
- What is the best way to get perfectly straight lines?
- What are the different methods used to clean the equipment?