Title: Describe safe use, handling, storage, labeling, and disposal of fuels and lubricants.
Course: Agricultural Power Systems (18402-I) > Section: Using Fuels, Lubricants, and Fluids

Description should include types of fuels and lubricants, the dangers of each, safe handling practices, storage requirements, and disposal as directed by federal, state, and local laws and regulations.

Process/Skill Questions:

- What are the three main types of fuel storage?
- Why is it important to use the proper type and color of portable cans?
- What are safety considerations for storing fuel?
- What are TSD facilities?
- Why is it important to minimize hazardous waste?