Title: (Optional) Troubleshoot and repair a safety system.
Course: Agricultural Power Systems (18402-I) > Section: Understanding Agricultural Machinery and Equipment Electrical Systems

Troubleshooting should include

- using electrical schematics and multimeters to diagnose
- using appropriate tools, equipment, and repair manuals
- following all safety precautions, procedures, guidelines, and manufacturer specifications.

Process/Skill Questions:

- What is the best type of electrical measure to use for a given job?
- Why is it important to repair and keep a safety switch in service?