Title: Identify components of electrical systems.
Course: Power and Transportation (20102-36) > Section: Exploring Electrical Power

Identification should include

- power sources
- inputs
- processes
- outputs
- feedback
- control devices
- conductors.

Process/Skill Questions:

- How does an electrical system transmit power?
- What materials make the best conductors? Insulators?
- What are the advantages of using an electrical system over a mechanical or fluid system?