Title: Troubleshoot mechanical systems.
Course: Power and Transportation (20102-36) > Section: Exploring Mechanical Power

Troubleshooting should include

- diagnosis
- repair
- documentation of findings.

Process/Skill Questions:

- How is the malfunctioning system identified?
- Are specific tools needed to repair the system?
- What is necessary to achieve safe, functional operation?