Title: Use instruments to collect quantitative data related to power systems.
Course: Power and Transportation (20102-36) > Section: Introducing Energy, Power, and Transportation

Use of instruments could include

- selection of instruments
- diagnostic software
- diagnostic tools
- measuring tools
- computer simulations.

Process/Skill Questions:

- What are the advantages of running simulations?
- How can a computer be used to troubleshoot a power system?
- What types of problems can be diagnosed in power and transportation systems?
- What diagnostic tools can aid in troubleshooting?