Title: Describe quality control measurement devices.
Course: Graphic Imaging Technology II (11154-II) > Section: Digital File Output

Description should include

- densitometer
- colorimeter
- plate readers
- spectrophotometer.

Process/Skill Questions:

- What two types of densitometers are commonly used in graphic reproduction?
- What measuring device is used to determine color values?
- Why is it important to use a measurement device for quality control?
- How do these devices measure consistency?
- What measuring device is used to determine color values?