Title: Identify the location(s) and proper use of emergency alarms, fire extinguishers, and other fire safety equipment in the facility.
Course: Graphic Imaging Technology II (11154-II) > Section: Practicing Safety and First Aid

Identification should include details about the location(s) and proper use of fire extinguisher and fire blanket, according to manufacturers’ guidelines.

Process/Skill Questions:

- Why do graphic imaging technology (GIT) employees need to know the location of fire safety equipment?
- What types of fire safety equipment are important in GIT?
- What types of fire-extinguishing equipment should be used to extinguish different types of fires?