Title: Apply the tools of bioinformatics.
Course: Biotechnology Foundations in Health and Medical Sciences (14252) > Section: Examining the Role of Biotechnology and Bioinformatics in Medicine

Application should include

- comparing DNA sequences across various individuals and species
- comparing genomics with proteomics
- identifying susceptibility to disease
- diagnosing disease
- identifying evolutionary connections by comparing the same gene across two or more species.

Process/Skill Questions:

- How can bioinformatic data be used to diagnose disease?
- What are the limitations of bioinformatics?