Title: Maintain workstation, equipment, materials, and supplies.
Course: Keyboarding Middle (12005-12) > Section: Understanding Computer Basics

Maintenance should demonstrate the student's acceptance of responsibility for

- ensuring power supply
- identifying malfunctions, missing programs, or problems with the computer and reporting issues to the instructor
- straightening and cleaning workstations
- exiting software programs and shutting down the computer
- filing/storing student work
- leaving equipment and the workstation according to instructor's guidelines.