Title: Define narrative design.
Course: Game Design and Development (10205-I) > Section: Examining Narrative Design

Definition should include the thematic and story components of the various elements involved in the game’s production, including art, sound, and writing.

Process/Skill Questions:

- What is the difference between story and narrative design?
- How can a game tell a story through art, mechanics, and sound?
- What ways are games different from other mediums in terms of storytelling?