Title: (Optional) Measure the performance of power-transmission systems.
Course: Power and Transportation (20102-18) > Section: Exploring Power Transmission and Control

Measurement may include

- torque
- horsepower
- time
- watts
- volts
- amps
- ohms
- capacity
- pressure
- vacuum
- compression.

Process/Skill Questions:

- What is the appropriate measuring device for each?
- How do you record measurements?
- What are the appropriate units of measurement for each?