Title: Identify emergency first aid procedures.
Course: Welding I (13207-I) > Section: Applying Basic Safety Standards

Identification should include procedures for accidents involving

- bodily fluids
- electrical injuries
- eye injuries
- falls
- burns.

Process/Skill Questions

- What are the steps that should be followed in the event of an accident?
- Why is knowing cardiopulmonary resuscitation (CPR) an important skill within the electrical trades?
- Why is it important to be certified to administer first aid?
- What are the different classifications (degrees) of electrical burns?