Title: (Optional) Operate machine OFC track burner equipment.
Course: Welding I (13207-I) > Section: Demonstrating Thermal Cutting

Operation should include

- following the written or verbal welding assignment
- adjusting equipment to obtain a neutral flame
- adjusting travel speed
- identifying types of cuts (e.g., bevel, straight)
- cutting the metal to the designated dimensions
- shutting down equipment at the end of the job.