Title: Identify minor external repairs to all equipment and accessories. -2
Course: Welding I (13207-I) > Section: Demonstrating Flux-cored Arc Welding

Identification should include minor repairs to FCAW-G equipment and accessories (e.g., contact tips, drive rollers, gas diffusers) in accordance with manufacturers' recommendations, school policies, and the instructor's guidelines.