Title: Perform safety inspections of all equipment and accessories.
Course: Welding I (13207-I) > Section: Demonstrating Shielded Metal Arc Welding (SMAW)

Performance should include a visual inspection of the following SMAW equipment and accessories on a daily basis, in accordance with the instructor's or employer's policy:

- Groundwork lead
- Electrode cable