Title: Disinfect electrical equipment.
Course: Master Barber II (Two-year Program) (19002-2YII) > Section: Maintaining and Disinfecting Implements, Equipment, and Facilities

Disinfecting should include

- removing hair and product from electrical equipment
- using appropriate disinfectant according to manufacturer specifications.

Process/Skill Questions:

- Who is responsible for maintaining electrical equipment in a sanitized state?
- What consequences may arise from the use of improperly disinfected equipment?
- What safety issues should be considered when cleaning electrical equipment?