Title: Disinfect combs, brushes, shears, and other implements.
Course: Master Barber II (Two-year Program) (19002-2YII) > Section: Maintaining and Disinfecting Implements, Equipment, and Facilities

Disinfecting should include the following steps:

- Remove hair from combs, brushes, and other implements.
- Cleanse implements with soap and water.
- Rinse implements.
- Dry implements.
- Disinfect implements by completely immersing them in approved disinfectant for at least 10 minutes, following manufacturer specifications.
- Rinse again.
- Dry again.
- Store implements in non-airtight container.

Process/Skill Questions:

- Who is responsible for maintaining implements in a sanitized state?
- What are the steps for proper disinfection?
- What is the correct way to store disinfected implements?