Title: Computer Networking Hardware Operations I (10101-1)

Demonstrating Personal Qualities and Abilities
  Demonstrate creativity and innovation.
  Demonstrate critical thinking and problem solving.
  Demonstrate initiative and self-direction.
  Demonstrate integrity.
  Demonstrate work ethic.
  WorkplaceReadinessSkillsPoster2019.pdf
Demonstrating Interpersonal Skills
  Demonstrate conflict-resolution skills.
  Demonstrate listening and speaking skills.
  Demonstrate respect for diversity.
  Demonstrate customer service skills.
  Collaborate with team members.
Demonstrating Professional Competencies
  Demonstrate big-picture thinking.
  Demonstrate career- and life-management skills.
  Demonstrate continuous learning and adaptability.
  Manage time and resources.
  Demonstrate information-literacy skills.
  Demonstrate an understanding of information security.
  Maintain working knowledge of current information-technology (IT) systems.
  Demonstrate proficiency with technologies, tools, and machines common to a specific occupation.
  Apply mathematical skills to job-specific tasks.
  Demonstrate professionalism.
  Demonstrate reading and writing skills.
  Demonstrate workplace safety.
Examining All Aspects of an Industry
  Examine aspects of planning within an industry/organization.
  Examine aspects of management within an industry/organization.
  Examine aspects of financial responsibility within an industry/organization.
  Examine technical and production skills required of workers within an industry/organization.
  Examine principles of technology that underlie an industry/organization.
  Examine labor issues related to an industry/organization.
  Examine community issues related to an industry/organization.
  Examine health, safety, and environmental issues related to an industry/organization.
Addressing Elements of Student Life
  Identify the purposes and goals of the student organization.
  Explain the benefits and responsibilities of membership in the student organization as a student and in professional/civic organizations as an adult.
  Demonstrate leadership skills through participation in student organization activities, such as meetings, programs, and projects.
  Identify Internet safety issues and procedures for complying with acceptable use standards.
Exploring Work-Based Learning
  Identify the types of work-based learning (WBL) opportunities.
  (Optional) Reflect on lessons learned during the WBL experience.
  Explore career opportunities related to the WBL experience.
  (Optional) Participate in a WBL experience, when appropriate.
Exploring Personal Computer (PC) Hardware
  Describe PC components.
  Select PC components.
  Disassemble a PC.
Assembling a PC
  Install components.
  Assemble a computer.
Understanding Advanced Computer Hardware
  Describe the boot-up process.
  Describe electrical power.
  Explain computer functionality.
  Configure a computer.
  Dispose of electronic components in a way that protects the environment.
Performing Preventive Maintenance and Troubleshooting
  Perform preventive maintenance on PCs.
  Troubleshoot PCs.
Describing Networking Concepts
  Describe computer networks.
  Describe networking protocols, standards, and services.
  Describe network devices.
  Describe network cables.
Configuring Devices to Communicate on a Network
  Configure devices.
  Describe the basic troubleshooting processes for networks.
Exploring Laptops and Other Mobile Devices
  Describe laptops and other mobile devices.
  Describe laptop configuration.
  Describe laptop hardware and component installation and configuration.
  Describe other mobile device hardware.
  Configure network connectivity and email.
  Perform preventive maintenance for laptops and other mobile devices.
  Describe troubleshooting for laptops and other mobile devices.
Installing Printers
  Identify common printer features.
  Compare printers.
  Install a printer.
  Configure printer sharing.
  Describe printer maintenance and troubleshooting.
Describing Virtualization and Cloud Computing
  Describe virtualization.
  Describe cloud computing.
Installing Windows Operating Systems (OS)
  Describe modern OS.
  Describe disk management.
  Install a Windows OS.
Configuring Windows
  Configure Windows Desktop and File Explorer.
  Configure Windows using Control Panels.
  Manage a Windows system.
  Use command-line tools.
  Perform Windows networking.
  Perform preventive maintenance.
  Perform troubleshooting processes.
Exploring Mobile, Linux, and OSX Operating Systems
  Describe mobile OS.
  Identify methods for securing mobile devices
  Describe Linux and macOS operating systems.
  Describe how to troubleshoot other OS.
Implementing Basic Host, Data, and Network Security
  Describe security threats.
  Explain security procedures.
  Secure Windows workstations.
  Configure wireless security.
  Explain the troubleshooting process for security.
Describing Professional Roles and Responsibilities in IT
  Identify communication skills.
  Manage operational procedures.
  Describe ethical and legal considerations in IT.
  Describe the role of call center technicians.
ADDITIONAL COURSE INFORMATION
  Student Competency Records (SCR)
  8542 8543 8544 8545 Teacher Resources Acronym Glossary.pdf
  8542 Standards Correlations.pdf
  8542 Credentials-Sequences-Clusters.pdf
  8542 8543 8544 8545 Acknowledgments and Copyright.pdf