Title: Syllabus
Course: Heating, Ventilation, Air Conditioning, and Refrigeration II (17056-II)

Copyright: 2020

Virginia Assignment Code: 8504

Suggested Grade Level: 11, 12

Duration: 36 weeks

Hours: 280

Credits: 2

Prerequisites: 8503

CTSO: SkillsUSA

Course Description:

This instructional program teaches students to professionally install, repair, and maintain the operating conditions of heating and cooling systems. Students also explore emerging technologies, Environmental Protection Agency (EPA) regulations, energy conservation techniques, and systems with exempt and non-exempt refrigerants. Completion of this sequence will prepare students for employment in a variety of heating, ventilation, air-conditioning, and refrigeration (HVACR) occupations. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Note:

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," or contact the Virginia Department of Education Office of Career, Technical, and Adult Education at cte@doe.virginia.gov.