Title: Pass a safety test for lab/site safety and for specific tool use.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration II (17056-II) > Section: Applying Basic Construction Safety Standards (Core Safety)

Passing should be required

- to measure participation in safety training programs (e.g., NCCER)
- to document attendance at safety meetings
- to demonstrate knowledge and skills gained from program topics (e.g., interpretation of SDS).

Process/Skill Questions:

- How often should technicians participate in safety training programs? Why?
- How does insurance impact the requirement of continuous retraining for safety?
- What is workers' compensation?