Title: Describe fire-extinguishment theory.
Course: Public Safety II (15101-II) > Section: FIREFIGHTING: Practicing Fire Suppression Techniques

Description should include the removal of heat, fuel, oxygen, or the continuous chemical reaction.

Process/Skill Questions:

- What factors determine how a fire should be controlled?
- What were the tragic events of the Great Chicago Fire? When did it occur?
- What is meant by thermal layering of gases?