Title: Replace door seals on a refrigerator.
Course: Building Management III (16103-III) > Section: Maintaining Interior and Exterior Upkeep

Replacement should include the following steps:

- Disconnect power and remove the door from the unit.
- Remove the clips or screws and take off the old seal.
- Clean the door where the new seal will be placed.
- Cut and install the new seal.

Process/Skill Questions:

- What safety procedures should be followed when replacing the door seals on a refrigerator?
- What are some conditions that require the replacement of a door seal?
- What kind of test can be performed to see if a new seal should be installed?