Title: Replace vent pipe flashings on roof.
Course: Building Management III (16103-III) > Section: Maintaining Interior and Exterior Upkeep

Replacement should include the following steps:

- Remove the shingles from around the vent pipe flashing.
- Use a pry bar to remove old flashing.
- Remove or drive loose nails down.
- Cover the area with new tar or roof cement.
- Replace the flashing.
- Replace the shingles.

Process/Skill Questions:

- What safety precautions should be followed when replacing vent pipe flashing on a roof?
- What are the characteristics of defective vent pipe flashing?
- What tools and materials are required for replacing vent pipe flashing?