Title: Syllabus
Course: Building Management III (16103-III)

Copyright: 2016

Course Code: 8592

Suggested Grade Level: 12

Duration: 36 weeks / 280 hours

Prerequisites: 8591

Course Description:

Building Management III is offered as a capstone course for high school. Students apply the knowledge and skills to perform advanced maintenance and upkeep of commercial and public buildings and grounds through specific hands-on training in cleaning operations, building repairs, electrical work, plumbing, and grounds maintenance.

“Building Management III” may be offered as a complement to an existing concentration sequence in any CTE program area.  In some instances, where noted, it may be combined with specific courses to create concentration sequences.

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," (https://law.lis.virginia.gov/admincode/title8/agency20/chapter120/section150/) or contact the Virginia Department of Education Office of Career, Technical and Adult Education at cte@doe.virginia.gov.