Title: Describe the importance of the Virginia Unified Statewide Building Code (USBC), what it governs, and how to use it as a reference.
Course: Carpentry II (17003-II) > Section: Interpreting Blueprints

Description should include

- locating the official, updated code
- identifying the major sections and how to quickly find information
- identifying the rationale behind the code
- identifying the agency that enforces the code
- citing examples of penalties for noncompliance.

Process/Skill Questions:

- How is the USBC enforced?
- How can builders and carpenters avoid code violations?
- Aside from penalties, what dangers exist when participating in building projects that are not compliant with the USBC?

NCCER Core: Introduction to Basic Construction Skills
Module 00105 Introduction to Construction Drawings provides trainees with the information and skills needed to read and understand construction drawings. This module includes a set of four oversize drawings, which is included as an Appendix in the Trainee Guide. The drawings are also available for download from www.nccerirc.com.

NCCER Carpentry
General Carpentry, Module 27114 Principles of Site and Building Layout explains how carpenters use specific construction drawings, as well as measuring tools and leveling instruments to perform basic site and building layout activities. Along with providing step-by-step instructions, this module describes the use of construction drawings and math to guarantee the accuracy of the building site.