Title: Identify attic area ventilators.
Course: Carpentry II (17003-II) > Section: Installing Roofing

Identification should include the various types of attic area ventilators, including

- gable end
- soffit
- roof top
- ridge vent.

Process/Skill Questions:

- What is the function of attic ventilators?
- What are the possible consequences of not ventilating an attic?

NCCER Carpentry
General Carpentry, Module 27112 Roof Framing describes the most common roof types and introduces basic roof framing components. Includes instructions for laying out rafters for gable roofs, hip roofs, and valley intersections. Covers stick-built and truss-built roofs, and includes the basics of roof sheathing installation.