Title: Maintain hand and power tools.
Course: Carpentry II (17003-II) > Section: Using Hand and Power Tools

Maintenance should include applying safety awareness and

- describing the rationale for keeping tools in good working order
- replacing tools in the same order and condition they were prior to their use (e.g., cleaning, lubricating, storing)
- checking calibration of tools
- making basic adjustments to or replacing worn components with instructor approval and by following manufacturer guidelines
- notifying the instructor about heavily worn, broken, or malfunctioning tools
- using the tool only for its intended purpose and adhering to all safety guidelines from the manufacturer, the instructor, and the school.

Process/Skill Questions:

- What are safety concerns when using a power circular saw?
- Why should a power tool always be grounded?
- Why should all tools be inspected before use?

NCCER Core: Introduction to Basic Construction Skills

Module 00101 Basic Safety (Construction Site Safety Orientation) explains the importance of safety in construction and industrial crafts. Trainees will learn how to identify and follow safe work practices and procedures and how to properly inspect and use safety equipment. Trainees will be able to describe the safety practices associated with elevated work; energy release; and various hazards encountered on job sites.

Module 00103 Introduction to Hand Tools instructs trainees in the identification, use, and care of hand tools. Developing the knowledge to properly choose and safely use hand tools is an essential part of the construction industry.

Module 00104 Introduction to Power Tools identifies and describes some of the power tools used by construction workers. The construction of each tool is discussed, along with information regarding the safe usage and typical maintenance requirements of power tools.