Title: Inspect, remove, and replace water pump.
Course: Automotive Technology III (20104-III) > Section: Engine Repair: Lubrication and Cooling Systems Diagnosis and Repair

Procedure should include following manufacturer guidelines.

ASE Education Foundation
2017 Automobile Service Technology (AST) Level
I. Engine Repair
D. Lubrication and Cooling Systems Diagnosis and Repair
Task 5

Process/Skill Questions:

- How should a technician inspect a water pump? How often should it be inspected?
- What are the procedures to replace a water pump?
- What precautions should be taken when replacing a water pump?