Title: Describe operation of safety systems and related circuits; determine needed repairs.
Course: Automotive Technology III (20104-III) > Section: Electrical/Electronic Systems: Body Electrical Systems Diagnosis and Repair

Description should include safety systems and related circuits such as horn, airbags, seat belt pretensioners, occupancy classification, wipers, washers, speed control/collision avoidance, heads-up display, park assist, and back-up camera. Description should also include

- identifying all safety components and related circuits
- understanding the function of safety systems and related circuits
- demonstrating the proper method of disabling SRS systems and associated safety.

ASE Education Foundation
2017 Automobile Service Technology (AST) Level
VI. Electrical/Electronic Systems
G. Body Electrical Systems Diagnosis and Repair
Task 4

Process/Skill Questions:

- Why is it important to research and follow manufacturer’s safety procedures when working supplemental restraint systems (SRS)?
- Why is it important to follow manufacturer-specific procedures for other vehicle safety systems (e.g., crash avoidance, heads-up display)?