Title: Demonstrate maintenance of a clear field.
Course: Dental Careers I (14054-I) > Section: Demonstrating Administrative Functions and Chairside Procedures

Demonstration should include

- using various items for retraction
- using a three-way syringe
- positioning a dental light.

Process/Skill Questions

- What are three uses for the mouth mirror?
- How can one prevent the mouth mirror from fogging?
- What precautions should be taken when retracting the tissue?