Title: Cabinetmaking II (17007-II)

Demonstrating Personal Qualities and Abilities
  Demonstrate creativity and innovation.
  Demonstrate critical thinking and problem solving.
  Demonstrate initiative and self-direction.
  Demonstrate integrity.
  Demonstrate work ethic.
  WorkplaceReadinessSkillsPoster2019.pdf
Demonstrating Interpersonal Skills
  Demonstrate conflict-resolution skills.
  Demonstrate listening and speaking skills.
  Demonstrate respect for diversity.
  Demonstrate customer service skills.
  Collaborate with team members.
Demonstrating Professional Competencies
  Demonstrate big-picture thinking.
  Demonstrate career- and life-management skills.
  Demonstrate continuous learning and adaptability.
  Manage time and resources.
  Demonstrate information-literacy skills.
  Demonstrate an understanding of information security.
  Maintain working knowledge of current information-technology (IT) systems.
  Demonstrate proficiency with technologies, tools, and machines common to a specific occupation.
  Apply mathematical skills to job-specific tasks.
  Demonstrate professionalism.
  Demonstrate reading and writing skills.
  Demonstrate workplace safety.
Examining All Aspects of an Industry
  Examine aspects of planning within an industry/organization.
  Examine aspects of management within an industry/organization.
  Examine aspects of financial responsibility within an industry/organization.
  Examine technical and production skills required of workers within an industry/organization.
  Examine principles of technology that underlie an industry/organization.
  Examine labor issues related to an industry/organization.
  Examine community issues related to an industry/organization.
  Examine health, safety, and environmental issues related to an industry/organization.
Addressing Elements of Student Life
  Identify the purposes and goals of the student organization.
  Explain the benefits and responsibilities of membership in the student organization as a student and in professional/civic organizations as an adult.
  Demonstrate leadership skills through participation in student organization activities, such as meetings, programs, and projects.
  Identify Internet safety issues and procedures for complying with acceptable use standards.
Exploring Work-Based Learning
  Identify the types of work-based learning (WBL) opportunities.
  (Optional) Reflect on lessons learned during the WBL experience.
  Explore career opportunities related to the WBL experience.
  (Optional) Participate in a WBL experience, when appropriate.
Applying Basic Construction Safety Standards (Core Safety)
  Comply with federal, state, and local safety legal requirements, including OSHA, VOSHA, and EPA.
  Identify personal protective equipment (PPE) requirements.
  Inspect and maintain a safe working environment.
  Explain safe working practices around electrical hazards.
  Identify emergency first-aid procedures.
  Identify the types of fires and the methods used to extinguish them.
  Inspect course-specific hand and power tools to visually identify defects.
  Demonstrate safe operation of course-specific hand and power tools.
  Demonstrate lifting and carrying techniques.
  Demonstrate safe laddering techniques.
  Report injuries.
  Report personal, environmental, and equipment safety violations to the appropriate authority.
  Pass safety exam.
Cutting and Shaping Stock
  Cut stock to size +/- 1/16 inch.
  Cut dado and rabbet joint.
  Cut mortise and tenon joint.
  Cut spline joint.
  Cut tongue and groove joint.
  Cut laminate.
Assembling, Fastening, and Installing Components
  Apply clamping devices for advanced joinery.
  Reinforce joints with block or dowel.
  Assemble drawer components.
  Construct case/box.
  Construct face frame.
  Explain procedures for assembling panel doors.
  Attach molding and trim.
  Fasten top to casework.
  Install cabinet hardware.
  Install cabinet doors.
  Install cabinet shelves.
Estimating and Selecting Materials
  Determine materials from a CAD drawing.
  Estimate labor and material cost.
Exploring Interior Finishes
  Install closet accessories, including shelving.
  Install baseboard.
  Install ceiling molding.
  Describe the installation process for residential kitchen, closet, and built-in cabinets.
  Describe the installation process for commercial casework and architectural millwork.
  Construct open shelving.
Applying Wood Veneers and Plastic Laminates
  Apply edge banding.
  Fit plastic laminate joints.
  Apply laminate, using contact cement.
  Apply wood edges.
  Cut out for sink.
Finishing Surfaces
  Apply safety rules when using finishing materials.
  Select finishing materials for compatibility.
  Apply stains.
  Apply lacquer, varnish, or polyurethane.
  Repair blemishes and touch up finishes.
Transporting and Installing Cabinets
  Prepare cabinets for transportation.
  Prepare wall and base cabinets for installation.
  Install wall and base cabinets.
  Select prefabricated cabinets.
  Install prefabricated countertops.
Installing Countertops and Backsplashes
  Identify the installation process for an undermount sink in a countertop.
  Identify the parts of a countertop.
  Identify considerations for handling solid-surface countertops.
  Describe the procedure for installing a backsplash.
Refacing Cabinets
  Identify benefits of cabinet refacing.
  Identify demolition procedures.
  Explain procedures for modifying cabinets.
  Explain procedures for installing bottom and side panels.
  Determine the need for new cabinet construction vs. cabinet refacing.
Investigating the Cabinetmaking Industry
  Identify educational opportunities related to cabinetmaking.
  Identify emerging technologies in the cabinetmaking industry.
  Identify career opportunities in the cabinetmaking industry.
  Explain the business environment that generates demand for cabinets and cabinetmaking.
Exploring Cabinet Design
  Create a rough sketch.
  Identify design considerations related to cabinetry.
  Identify the advantages of using CAD software vs. hand drawing.
  Draw detailed plans, using CAD software.
Exploring CNC Equipment and Routers
  Identify major types of CNC machinery.
  Explain the CNC machining process for woodworking.
  Identify tooling used with CNC machinery.
Additional Course Information (for instructors only; do not publish for students).
  Student Competency Records
  8605 Standards Correlations.pdf
  8605 Credentials-Sequences-Clusters.pdf
  8604-8605 Acknowledgments and Copyright Information.pdf